0 0.2 0.4 0.6 0.8 1

75 100 125 150 175 200 225 250 275

M_{LQ} (GeV) β(LQ 5 e + q)

D0 combined Limit H1 limit ( λ=0.1 ) H1 limit ( λ=0.05 ) (NC data only)

EXCLUDED

F=0 Scalar LQ coupling to e^+ + d

H1